         178           8
  -23.5483455152721       -24.0940100751893       -24.6316636108685     
  -25.0839596007212       -25.5100085794887       -26.0077217281313     
  -26.4140433255251       -26.6133065012793     
  -2.79526213138728       -2.38657919386617       -2.62291793667498     
  -2.63882884945917       -2.57151726192721       -2.49740718166007     
  -2.44858641289909       -2.38336093610960     
  5.334702939702916E-003  0.000000000000000E+000
  0.988218635744254       0.000000000000000E+000
  0.985347611882854       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
