         180           8
   5.88893900740957        5.82348842023084        5.71708219716071     
   5.63938722060118        5.57742678281138        5.55888678207369     
   5.57570682849733        5.59732877637542     
  -17.7264268234362       -17.9088727947864       -17.8654592631482     
  -17.7537407334104       -17.3245897268236       -16.8597569919194     
  -16.4833379586445       -16.0979123828678     
 -2.366941360309204E-002  0.000000000000000E+000
   1.01173555371879       0.000000000000000E+000
   1.01699994766420       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
