         180           3
  -25.5060435262429       -23.5577945212212       -21.4591711205107     
  -4.18946276410190       -3.89901551904512       -2.61292059880573     
  5.045593977416299E-003  0.000000000000000E+000
  0.988107195479720       0.000000000000000E+000
  0.985583722810589       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
