         180           8
   6.07778044232864        5.97207257102141        5.82453023578065     
   5.68684582413940        5.59446906560945        5.56619768188734     
   5.60358482195489        5.63401500811004     
  -18.3268473042675       -18.2024676138130       -17.9105460419884     
  -17.5830305710635       -17.2257185412449       -16.8153688757040     
  -16.4330358459678       -15.9532444216333     
 -2.362198138512547E-002  0.000000000000000E+000
   1.01137529159472       0.000000000000000E+000
   1.01727629023716       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
