         180           3
  -25.4492405624387       -23.6168944924263       -21.4631413082948     
  -4.68544042989473       -3.86307419352183       -2.63363729563747     
  5.021596533479077E-003  0.000000000000000E+000
  0.987992296737460       0.000000000000000E+000
  0.985620464996546       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
