         180           8
   5.98021360907437        5.54531206415435        5.29387733904625     
   5.19685547492505        5.28485211516123        5.23507351678519     
   5.17211686077037        5.13827013131090     
  -18.2502371258707       -18.5341399209285       -18.9107862803208     
  -19.3539614662945       -20.1333166020573       -20.8884499652224     
  -21.2234630499382       -21.4899992789000     
 -2.312991347001154E-002  0.000000000000000E+000
   1.01105297505122       0.000000000000000E+000
   1.01694427781196       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
