         180           8
  -24.1250076948150       -24.8110666321335       -25.3863262094422     
  -25.8853982200520       -26.3661597327296       -26.9857286339287     
  -27.3646944952419       -27.8301712784064     
  -4.38779298733173       -4.26120579450045       -4.13989370364523     
  -4.09396559109406       -4.03474468098866       -3.81746813733431     
  -3.53183963376192       -3.32778167207636     
  4.987104726041763E-003  0.000000000000000E+000
  0.987963417976686       0.000000000000000E+000
  0.985918073356560       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
