         180           8
   4.37053687902505        4.00516993310251        3.63708682613837     
   3.32967109756855        3.20539816131414        2.99097214552679     
   2.69565587510267        2.39969572703343     
  -13.6386189560446       -13.0828908767009       -12.6968157053989     
  -12.5480857590524       -12.7099171602314       -12.8891572435128     
  -12.8096763443532       -12.4429097101848     
 -2.296207829635460E-002  0.000000000000000E+000
   1.01068352705957       0.000000000000000E+000
   1.01667974350522       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
