         180           8
  -25.2732766895321       -26.0024159217094       -26.7122455555822     
  -27.4009559118961       -28.0737862168434       -28.8275066254896     
  -29.4665760779895       -30.0753039428586     
   1.32104016230330        2.21509289437837        3.03286752265875     
   3.79308011666683        4.49919949623169        5.19828290313014     
   5.94842879002484        6.84921007109317     
  5.053790532387422E-003  0.000000000000000E+000
  0.987538413220770       0.000000000000000E+000
  0.985111326153553       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
