         180           8
   3.60359203777465        3.34173998185504        2.99337532937590     
   2.75248337353450        2.67051481822004        2.53240981343973     
   2.35001714642751        2.12111687212969     
  -7.75600936226219       -7.73309343206628       -7.69608897700882     
  -7.81463261809146       -8.16598120003403       -8.58508698438174     
  -8.70643883790766       -8.72320088812650     
 -2.288930365808294E-002  0.000000000000000E+000
   1.01135008276575       0.000000000000000E+000
   1.01652572981864       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
