         180           8
  -25.9449386494134       -26.5083932273732       -27.1818839313381     
  -27.8375293556635       -28.5012503010734       -29.2167787033902     
  -29.8387187813924       -30.3375388151593     
   6.98693786785263        7.44263924682275        7.93259680090036     
   8.40717878658294        8.88818875279643        9.47452981411508     
   10.0598922320654        10.6028649773462     
  5.180910041304349E-003  0.000000000000000E+000
  0.988275191276120       0.000000000000000E+000
  0.985062687331368       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
