         180           8
  -3.61438361036678       -4.09285992485720       -4.59820916223362     
  -5.00159849187488       -5.36804136689554       -5.71719144364055     
  -5.92506700826954       -6.07780200215450     
  0.104038400626428       0.256622068802273       0.292519293873919     
  0.401742459388738       0.387421339931054       0.369809497271093     
  0.486121087993603       0.380823752547664     
 -1.196580194585614E-002  0.000000000000000E+000
   1.00884406664203       0.000000000000000E+000
   1.01281689957250       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
