         180           8
  -3.20571558626895       -3.95909305473273       -4.48195392891467     
  -4.83003131794474       -5.08754642975414       -5.31630824567768     
  -5.30425717651873       -5.45977146399159     
   2.80786070690369        2.89408451192181        3.06513810033251     
   3.18083602393421        3.51982788032654        4.02158452517647     
   4.24048116024999        4.79761375023512     
 -1.677920390051485E-003  0.000000000000000E+000
  0.986604422775999       0.000000000000000E+000
  0.983246140397984       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
