         180           8
  -4.00234582644082       -4.44054073254956       -4.88299270961869     
  -5.27063972176216       -5.63799166897058       -6.07410985608548     
  -6.43774023281225       -6.74635064338415     
   1.22748925272530        1.03559541386149       0.951826885921246     
  0.846019385172235       0.688752383146926       0.638917633010387     
  0.678293544587653       0.767933234777755     
 -1.187552388978203E-002  0.000000000000000E+000
   1.00796223717842       0.000000000000000E+000
   1.01317817832755       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
