         180           8
  -1.40604873861429       -2.08058179896363       -2.67163594956650     
  -3.19168911260998       -3.70263719350341       -4.21447113836284     
  -4.65471742614635       -4.82737546137050     
   3.07876964993911        3.03105447266251        3.03455295022645     
   3.08274487748755        3.18614194244923        3.35842164342958     
   3.54856023261371        3.73150623718283     
 -1.811062827847939E-003  0.000000000000000E+000
  0.986291282781397       0.000000000000000E+000
  0.983214011686026       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
