         105           8
   2.66047453241377       -4.69401502412435       -4.92958632195917     
  -5.19360609075077       -5.49667127095523       -5.71112513903894     
  -5.91180597010165       -6.60357902452674     
   3.65223675415748        1.91005213562043        1.78460454219570     
   1.79286499406005        1.73270914903013        1.79479070897543     
   1.87506163013013        1.93860048059203     
 -1.184705282212023E-002  0.000000000000000E+000
   1.00863591820794       0.000000000000000E+000
   1.01340892385902       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
