         180           8
  0.956724455248317       0.231367290203357      -0.186482608720182     
 -0.606249357540726      -0.982291148874583       -1.28763535317075     
  -1.60939577267420       -1.86076055927459     
  -3.24243800703383       -3.40714280439821       -3.61698176744300     
  -3.86133560116111       -4.08002885204696       -4.29397161869021     
  -4.47585267704605       -4.66858846417799     
 -1.242872383148219E-002  0.000000000000000E+000
   1.01029459824342       0.000000000000000E+000
   1.01474181722672       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
