         180           8
  -2.48202526825022       -3.31321214679609       -3.80780893170788     
  -4.31771941871723       -4.75912095229310       -5.12224280007034     
  -5.49281837537217       -5.71263097771777     
  -2.37615409046744       -2.27628289942594       -2.25384971138681     
  -2.24947771498908       -2.18121118117770       -2.08593031264362     
  -2.03960448474801       -2.46308480183188     
 -1.193566851985907E-003  0.000000000000000E+000
  0.987629634307964       0.000000000000000E+000
  0.985363224786874       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
