         180           8
  -1.81367298463190       -2.00121854688359       -2.74075196709668     
  -3.58606971207422       -4.04762066537893       -4.42802681737452     
  -4.76430259202001       -5.23124561247070     
  1.935647576635025E-002  0.752820359131348        1.47186246215315     
   2.16120276876480        2.94296380659199        3.75716660792710     
   4.55366992752483        5.32130444496799     
 -1.477989281685852E-003  0.000000000000000E+000
  0.987311727818624       0.000000000000000E+000
  0.984947017615736       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
