         180           8
  -4.01390449021991       -4.30246236769803       -4.54611448089870     
  -4.72453351070848       -4.93261548867555       -5.04228351420415     
  -5.07338508383815       -5.25820152060806     
   1.55291128545379        1.60035811980477        1.73484063355781     
   1.86300594497882        2.05480534384212        2.31081158891380     
   2.58958079151035        2.78166778866897     
 -1.168301765052119E-002  0.000000000000000E+000
   1.00855370589959       0.000000000000000E+000
   1.01282290394978       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
