         180           8
  -3.20341560321646       -3.45000179450465       -3.63891009196171     
  -3.83491374689465       -3.95423502755316       -4.06294139506956     
  -4.22153990597638       -4.18857110424092     
   1.57069950295958        1.65052984952038        1.82221923343248     
   2.01543469811167        2.22769411888221        2.40352553387978     
   2.60434764817297        2.85127362064978     
 -1.154170107892732E-002  0.000000000000000E+000
   1.00829567954238       0.000000000000000E+000
   1.01253585220920       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
