         180           8
   7.55308008922207        6.87752433397414        6.38157970566447     
   5.92359686693167        5.48029701180962        5.02418923937500     
   4.70139274140834        4.48275448371875     
   30.2986155834266        29.9816999854165        29.6736661912829     
   29.3187139390929        29.0133923136349        28.7565990645053     
   28.5815596732579        28.6689309270479     
 -1.158855632244742E-002  0.000000000000000E+000
   1.00924350555775       0.000000000000000E+000
   1.01418704709607       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
